<template>
  <v-app-bar flat>
    <v-app-bar-title class="sc">
      <v-icon icon="mdi-chart-line" />
      DexOrder
      <v-chip text="alpha test" size="small" color="red"/>
    </v-app-bar-title>
  </v-app-bar>
</template>

<script setup>
</script>
